From 15e1eeeb96efa730419c36e4e8cc639ecbbdf94b Mon Sep 17 00:00:00 2001
From: Pinapelz <yukais@pinapelz.com>
Date: Sun, 19 Nov 2023 00:46:47 -0800
Subject: update graph iframe height vh - fix scroll bug

---
 src/app/page.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/app/page.tsx')

diff --git a/src/app/page.tsx b/src/app/page.tsx
index 81c12b6..7a40c0a 100644
--- a/src/app/page.tsx
+++ b/src/app/page.tsx
@@ -7,7 +7,7 @@ async function Home(){
     return(
         <>
             <TitleBar title="Nijitracker" />
-            <div className="sm:block hidden mt-4" style={{ overflow: 'hidden', height: '88vh', position: 'relative' }}>
+            <div className="sm:block hidden mt-4" style={{ overflow: 'hidden', height: '105vh', position: 'relative' }}>
                 <iframe src={apiUrl} style={{ position: 'absolute', top: 0, left: 0 }} width="100%" height="100%"></iframe>
             </div>
             <SubscriberTable {...data} />
-- 
cgit v1.2.3

