From b42742839af8e126520acd17cdd3aa6303634d60 Mon Sep 17 00:00:00 2001
From: Pinapelz <yukais@pinapelz.com>
Date: Wed, 27 Aug 2025 16:17:00 -0700
Subject: fix incorrect internal page value for homepage

---
 frontend/src/pages/Home.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'frontend/src/pages/Home.tsx')

diff --git a/frontend/src/pages/Home.tsx b/frontend/src/pages/Home.tsx
index 0aba7f0..71ba772 100644
--- a/frontend/src/pages/Home.tsx
+++ b/frontend/src/pages/Home.tsx
@@ -72,7 +72,7 @@ const Home = () => {
 
   return (
     <div className="min-h-screen bg-slate-950">
-      <NavBar user={user} handleLogout={handleLogout} currentPage="import"/>
+      <NavBar user={user} handleLogout={handleLogout} currentPage="home"/>
 
       {/* Main Content */}
       <div className="max-w-7xl mx-auto px-4 sm:px-6 lg:px-8 py-8">
-- 
cgit v1.2.3

