From 458561f5934d49e6785226f6ae446093804393e2 Mon Sep 17 00:00:00 2001
From: Pinapelz <yukais@pinapelz.com>
Date: Mon, 14 Apr 2025 16:30:47 -0700
Subject: fix: rasis image sizing ratio

---
 site/src/components/TitleBar.tsx | 12 ++++++------
 1 file changed, 6 insertions(+), 6 deletions(-)

(limited to 'site/src/components/TitleBar.tsx')

diff --git a/site/src/components/TitleBar.tsx b/site/src/components/TitleBar.tsx
index 7f9f6ac..43976c1 100644
--- a/site/src/components/TitleBar.tsx
+++ b/site/src/components/TitleBar.tsx
@@ -47,12 +47,12 @@ const TitleBar: React.FC = () => {
         <div className="bg-gray-900 border-b border-gray-800 py-4 px-6">
             <div className="max-w-[800px] mx-auto">
                 <div className="flex flex-col sm:flex-row justify-between items-center">
-                    <div className="flex items-center space-x-3 mb-3 sm:mb-0">
-                        <img
-                            src="/rasis.webp"
-                            alt="573 Updates Logo"
-                            className="w-8 h-8"
-                        />
+                  <div className="flex items-center space-x-3 mb-3 sm:mb-0">
+                      <img
+                          src="/rasis.webp"
+                          alt="573 Updates Logo"
+                          className="w-8 h-8 object-contain"
+                      />
                         <div className="w-8 h-8 bg-red-700 rounded-md flex items-center justify-center">
                             <span className="text-white font-bold">573</span>
                         </div>
-- 
cgit v1.2.3

